/*
  Warnings:

  - Added the required column `remainedInStock` to the `Stock_Movements` table without a default value. This is not possible if the table is not empty.

*/
-- AlterTable
ALTER TABLE `Stock_Movements` ADD COLUMN `remainedInStock` DECIMAL(10, 2) NOT NULL;
